\hypertarget{_legacy_2_data_i_o_2_generic_reader_8h}{\section{Modules/\-Legacy/\-Data\-I\-O/\-Generic\-Reader.h File Reference}
\label{_legacy_2_data_i_o_2_generic_reader_8h}\index{Modules/\-Legacy/\-Data\-I\-O/\-Generic\-Reader.\-h@{Modules/\-Legacy/\-Data\-I\-O/\-Generic\-Reader.\-h}}
}
{\ttfamily \#include $<$Dataflow/\-Network/\-Ports/\-String\-Port.\-h$>$}\\*
{\ttfamily \#include $<$Core/\-Datatypes/\-String.\-h$>$}\\*
{\ttfamily \#include $<$Dataflow/\-Gui\-Interface/\-Gui\-Var.\-h$>$}\\*
{\ttfamily \#include $<$Dataflow/\-Network/\-Module.\-h$>$}\\*
{\ttfamily \#include $<$sys/stat.\-h$>$}\\*
\subsection*{Classes}
\begin{DoxyCompactItemize}
\item 
class \hyperlink{class_s_c_i_run_1_1_generic_reader}{Generic\-Reader$<$ H\-Type $>$}
\end{DoxyCompactItemize}
\subsection*{Namespaces}
\begin{DoxyCompactItemize}
\item 
\hyperlink{namespace_s_c_i_run}{S\-C\-I\-Run}
\begin{DoxyCompactList}\small\item\em S\-T\-L datatypes needed. \end{DoxyCompactList}\end{DoxyCompactItemize}
