\hypertarget{_timer_8h}{\section{Core/\-Utils/\-Legacy/\-Timer.h File Reference}
\label{_timer_8h}\index{Core/\-Utils/\-Legacy/\-Timer.\-h@{Core/\-Utils/\-Legacy/\-Timer.\-h}}
}


Interface to portable timer utility classes.  


{\ttfamily \#include $<$Core/\-Utils/\-Legacy/share.\-h$>$}\\*
\subsection*{Classes}
\begin{DoxyCompactItemize}
\item 
class \hyperlink{class_s_c_i_run_1_1_timer}{Timer}
\item 
class \hyperlink{class_s_c_i_run_1_1_c_p_u_timer}{C\-P\-U\-Timer}
\item 
class \hyperlink{class_s_c_i_run_1_1_wall_clock_timer}{Wall\-Clock\-Timer}
\item 
class \hyperlink{class_s_c_i_run_1_1_time_throttle}{Time\-Throttle}
\end{DoxyCompactItemize}
\subsection*{Namespaces}
\begin{DoxyCompactItemize}
\item 
\hyperlink{namespace_s_c_i_run}{S\-C\-I\-Run}
\begin{DoxyCompactList}\small\item\em S\-T\-L datatypes needed. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Interface to portable timer utility classes. \begin{DoxyAuthor}{Author}
Steven G. Parker Department of Computer Science University of Utah 
\end{DoxyAuthor}
\begin{DoxyDate}{Date}
Feb. 1994 
\end{DoxyDate}
