\hypertarget{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings}{\section{Network\-Global\-Settings Class Reference}
\label{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings}\index{Network\-Global\-Settings@{Network\-Global\-Settings}}
}


{\ttfamily \#include $<$Network\-Settings.\-h$>$}

Inheritance diagram for Network\-Global\-Settings\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
std\-::string \hyperlink{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings_aa514b55ac660d4d047575b78e564b577}{value} (const std\-::string \&key) const 
\item 
void \hyperlink{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings_a7533453ea01a49702611ca53816be586}{set\-Value} (const std\-::string \&key, const std\-::string \&\hyperlink{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings_aa514b55ac660d4d047575b78e564b577}{value})
\end{DoxyCompactItemize}


\subsection{Member Function Documentation}
\hypertarget{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings_a7533453ea01a49702611ca53816be586}{\index{S\-C\-I\-Run\-::\-Dataflow\-::\-Networks\-::\-Network\-Global\-Settings@{S\-C\-I\-Run\-::\-Dataflow\-::\-Networks\-::\-Network\-Global\-Settings}!set\-Value@{set\-Value}}
\index{set\-Value@{set\-Value}!SCIRun::Dataflow::Networks::NetworkGlobalSettings@{S\-C\-I\-Run\-::\-Dataflow\-::\-Networks\-::\-Network\-Global\-Settings}}
\subsubsection[{set\-Value}]{\setlength{\rightskip}{0pt plus 5cm}void set\-Value (
\begin{DoxyParamCaption}
\item[{const std\-::string \&}]{key, }
\item[{const std\-::string \&}]{value}
\end{DoxyParamCaption}
)}}\label{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings_a7533453ea01a49702611ca53816be586}
\hypertarget{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings_aa514b55ac660d4d047575b78e564b577}{\index{S\-C\-I\-Run\-::\-Dataflow\-::\-Networks\-::\-Network\-Global\-Settings@{S\-C\-I\-Run\-::\-Dataflow\-::\-Networks\-::\-Network\-Global\-Settings}!value@{value}}
\index{value@{value}!SCIRun::Dataflow::Networks::NetworkGlobalSettings@{S\-C\-I\-Run\-::\-Dataflow\-::\-Networks\-::\-Network\-Global\-Settings}}
\subsubsection[{value}]{\setlength{\rightskip}{0pt plus 5cm}std\-::string value (
\begin{DoxyParamCaption}
\item[{const std\-::string \&}]{key}
\end{DoxyParamCaption}
) const}}\label{class_s_c_i_run_1_1_dataflow_1_1_networks_1_1_network_global_settings_aa514b55ac660d4d047575b78e564b577}


The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
Dataflow/\-Network/\hyperlink{_network_settings_8h}{Network\-Settings.\-h}\item 
Dataflow/\-Network/\hyperlink{_network_settings_8cc}{Network\-Settings.\-cc}\end{DoxyCompactItemize}
