\hypertarget{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_manhattan}{\section{Connection\-In\-Progress\-Manhattan Class Reference}
\label{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_manhattan}\index{Connection\-In\-Progress\-Manhattan@{Connection\-In\-Progress\-Manhattan}}
}


{\ttfamily \#include $<$Connection.\-h$>$}

Inheritance diagram for Connection\-In\-Progress\-Manhattan\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.400000cm]{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_manhattan}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_manhattan_a8440efd67b8006cb0011bf9dc6edca66}{Connection\-In\-Progress\-Manhattan} (\hyperlink{class_s_c_i_run_1_1_gui_1_1_port_widget}{Port\-Widget} $\ast$port, \hyperlink{namespace_s_c_i_run_1_1_gui_aa15e2a3bdeabd827b99534e6f6db29a9}{Connection\-Draw\-Strategy\-Ptr} drawer)
\item 
virtual void \hyperlink{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_manhattan_a37b3f50ebe6ae3f4be881a9711d4f6e4}{update} (const Q\-Point\-F \&end)
\end{DoxyCompactItemize}
\subsection*{Additional Inherited Members}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_manhattan_a8440efd67b8006cb0011bf9dc6edca66}{\index{S\-C\-I\-Run\-::\-Gui\-::\-Connection\-In\-Progress\-Manhattan@{S\-C\-I\-Run\-::\-Gui\-::\-Connection\-In\-Progress\-Manhattan}!Connection\-In\-Progress\-Manhattan@{Connection\-In\-Progress\-Manhattan}}
\index{Connection\-In\-Progress\-Manhattan@{Connection\-In\-Progress\-Manhattan}!SCIRun::Gui::ConnectionInProgressManhattan@{S\-C\-I\-Run\-::\-Gui\-::\-Connection\-In\-Progress\-Manhattan}}
\subsubsection[{Connection\-In\-Progress\-Manhattan}]{\setlength{\rightskip}{0pt plus 5cm}{\bf Connection\-In\-Progress\-Manhattan} (
\begin{DoxyParamCaption}
\item[{{\bf Port\-Widget} $\ast$}]{port, }
\item[{{\bf Connection\-Draw\-Strategy\-Ptr}}]{drawer}
\end{DoxyParamCaption}
)}}\label{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_manhattan_a8440efd67b8006cb0011bf9dc6edca66}


\subsection{Member Function Documentation}
\hypertarget{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_manhattan_a37b3f50ebe6ae3f4be881a9711d4f6e4}{\index{S\-C\-I\-Run\-::\-Gui\-::\-Connection\-In\-Progress\-Manhattan@{S\-C\-I\-Run\-::\-Gui\-::\-Connection\-In\-Progress\-Manhattan}!update@{update}}
\index{update@{update}!SCIRun::Gui::ConnectionInProgressManhattan@{S\-C\-I\-Run\-::\-Gui\-::\-Connection\-In\-Progress\-Manhattan}}
\subsubsection[{update}]{\setlength{\rightskip}{0pt plus 5cm}void update (
\begin{DoxyParamCaption}
\item[{const Q\-Point\-F \&}]{end}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [virtual]}}}\label{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_manhattan_a37b3f50ebe6ae3f4be881a9711d4f6e4}


Implements \hyperlink{class_s_c_i_run_1_1_gui_1_1_connection_in_progress_abb5988a3e2152b1d8f7eb2794290ead1}{Connection\-In\-Progress}.



The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
Interface/\-Application/\hyperlink{_interface_2_application_2_connection_8h}{Connection.\-h}\item 
Interface/\-Application/\hyperlink{_interface_2_application_2_connection_8cc}{Connection.\-cc}\end{DoxyCompactItemize}
