\hypertarget{class_s_c_i_run_1_1_gui_1_1_dialog_error_control}{\section{Dialog\-Error\-Control Class Reference}
\label{class_s_c_i_run_1_1_gui_1_1_dialog_error_control}\index{Dialog\-Error\-Control@{Dialog\-Error\-Control}}
}


{\ttfamily \#include $<$Dialog\-Error\-Control.\-h$>$}

Inheritance diagram for Dialog\-Error\-Control\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{class_s_c_i_run_1_1_gui_1_1_dialog_error_control}
\end{center}
\end{figure}
\subsection*{Public Slots}
\begin{DoxyCompactItemize}
\item 
void \hyperlink{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_a758fa7cb3c572ae21c3f43fefe205fd5}{reset\-Counter} ()
\end{DoxyCompactItemize}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_a8504e0025967d99b786d1184bc2cfdca}{Dialog\-Error\-Control} (Q\-Widget $\ast$parent)
\item 
void \hyperlink{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_ad4dc02fd0c9573ca45f06e2e30f6a765}{increase\-Counter} ()
\item 
bool \hyperlink{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_a2bbb00101f1003b266031a0efa8d27bc}{show\-Dialog} ()
\end{DoxyCompactItemize}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_a8504e0025967d99b786d1184bc2cfdca}{\index{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control@{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control}!Dialog\-Error\-Control@{Dialog\-Error\-Control}}
\index{Dialog\-Error\-Control@{Dialog\-Error\-Control}!SCIRun::Gui::DialogErrorControl@{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control}}
\subsubsection[{Dialog\-Error\-Control}]{\setlength{\rightskip}{0pt plus 5cm}{\bf Dialog\-Error\-Control} (
\begin{DoxyParamCaption}
\item[{Q\-Widget $\ast$}]{parent}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [explicit]}}}\label{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_a8504e0025967d99b786d1184bc2cfdca}


\subsection{Member Function Documentation}
\hypertarget{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_ad4dc02fd0c9573ca45f06e2e30f6a765}{\index{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control@{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control}!increase\-Counter@{increase\-Counter}}
\index{increase\-Counter@{increase\-Counter}!SCIRun::Gui::DialogErrorControl@{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control}}
\subsubsection[{increase\-Counter}]{\setlength{\rightskip}{0pt plus 5cm}void increase\-Counter (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_ad4dc02fd0c9573ca45f06e2e30f6a765}
\hypertarget{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_a758fa7cb3c572ae21c3f43fefe205fd5}{\index{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control@{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control}!reset\-Counter@{reset\-Counter}}
\index{reset\-Counter@{reset\-Counter}!SCIRun::Gui::DialogErrorControl@{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control}}
\subsubsection[{reset\-Counter}]{\setlength{\rightskip}{0pt plus 5cm}void reset\-Counter (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [slot]}}}\label{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_a758fa7cb3c572ae21c3f43fefe205fd5}
\hypertarget{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_a2bbb00101f1003b266031a0efa8d27bc}{\index{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control@{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control}!show\-Dialog@{show\-Dialog}}
\index{show\-Dialog@{show\-Dialog}!SCIRun::Gui::DialogErrorControl@{S\-C\-I\-Run\-::\-Gui\-::\-Dialog\-Error\-Control}}
\subsubsection[{show\-Dialog}]{\setlength{\rightskip}{0pt plus 5cm}bool show\-Dialog (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{class_s_c_i_run_1_1_gui_1_1_dialog_error_control_a2bbb00101f1003b266031a0efa8d27bc}


The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
Interface/\-Application/\hyperlink{_dialog_error_control_8h}{Dialog\-Error\-Control.\-h}\item 
Interface/\-Application/\hyperlink{_dialog_error_control_8cc}{Dialog\-Error\-Control.\-cc}\end{DoxyCompactItemize}
