\hypertarget{class_s_c_i_run_1_1_wall_clock_timer}{\section{Wall\-Clock\-Timer Class Reference}
\label{class_s_c_i_run_1_1_wall_clock_timer}\index{Wall\-Clock\-Timer@{Wall\-Clock\-Timer}}
}


{\ttfamily \#include $<$Timer.\-h$>$}

Inheritance diagram for Wall\-Clock\-Timer\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=3.000000cm]{class_s_c_i_run_1_1_wall_clock_timer}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{class_s_c_i_run_1_1_wall_clock_timer_a974829093ce9a21109ace40a52579b39}{Wall\-Clock\-Timer} ()
\item 
virtual \hyperlink{class_s_c_i_run_1_1_wall_clock_timer_a3afdf21271b69c0d954a29f6311f9683}{$\sim$\-Wall\-Clock\-Timer} ()
\end{DoxyCompactItemize}
\subsection*{Protected Member Functions}
\begin{DoxyCompactItemize}
\item 
virtual double \hyperlink{class_s_c_i_run_1_1_wall_clock_timer_ac8ee829e09b6e966d89b662507450789}{get\-\_\-time} ()
\end{DoxyCompactItemize}
\subsection*{Additional Inherited Members}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{class_s_c_i_run_1_1_wall_clock_timer_a974829093ce9a21109ace40a52579b39}{\index{S\-C\-I\-Run\-::\-Wall\-Clock\-Timer@{S\-C\-I\-Run\-::\-Wall\-Clock\-Timer}!Wall\-Clock\-Timer@{Wall\-Clock\-Timer}}
\index{Wall\-Clock\-Timer@{Wall\-Clock\-Timer}!SCIRun::WallClockTimer@{S\-C\-I\-Run\-::\-Wall\-Clock\-Timer}}
\subsubsection[{Wall\-Clock\-Timer}]{\setlength{\rightskip}{0pt plus 5cm}{\bf Wall\-Clock\-Timer} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{class_s_c_i_run_1_1_wall_clock_timer_a974829093ce9a21109ace40a52579b39}
\hypertarget{class_s_c_i_run_1_1_wall_clock_timer_a3afdf21271b69c0d954a29f6311f9683}{\index{S\-C\-I\-Run\-::\-Wall\-Clock\-Timer@{S\-C\-I\-Run\-::\-Wall\-Clock\-Timer}!$\sim$\-Wall\-Clock\-Timer@{$\sim$\-Wall\-Clock\-Timer}}
\index{$\sim$\-Wall\-Clock\-Timer@{$\sim$\-Wall\-Clock\-Timer}!SCIRun::WallClockTimer@{S\-C\-I\-Run\-::\-Wall\-Clock\-Timer}}
\subsubsection[{$\sim$\-Wall\-Clock\-Timer}]{\setlength{\rightskip}{0pt plus 5cm}virtual $\sim${\bf Wall\-Clock\-Timer} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [virtual]}}}\label{class_s_c_i_run_1_1_wall_clock_timer_a3afdf21271b69c0d954a29f6311f9683}


\subsection{Member Function Documentation}
\hypertarget{class_s_c_i_run_1_1_wall_clock_timer_ac8ee829e09b6e966d89b662507450789}{\index{S\-C\-I\-Run\-::\-Wall\-Clock\-Timer@{S\-C\-I\-Run\-::\-Wall\-Clock\-Timer}!get\-\_\-time@{get\-\_\-time}}
\index{get\-\_\-time@{get\-\_\-time}!SCIRun::WallClockTimer@{S\-C\-I\-Run\-::\-Wall\-Clock\-Timer}}
\subsubsection[{get\-\_\-time}]{\setlength{\rightskip}{0pt plus 5cm}virtual double get\-\_\-time (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [protected]}, {\ttfamily [virtual]}}}\label{class_s_c_i_run_1_1_wall_clock_timer_ac8ee829e09b6e966d89b662507450789}


Implements \hyperlink{class_s_c_i_run_1_1_timer_ae8fb5ce111fe49bae842c81a45a8ffe1}{Timer}.



The documentation for this class was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
Core/\-Utils/\-Legacy/\hyperlink{_timer_8h}{Timer.\-h}\end{DoxyCompactItemize}
