\hypertarget{dir_e2e76aec16ff3b47ba59ca9e0216dd1a}{\section{Core/\-Utils/\-Legacy Directory Reference}
\label{dir_e2e76aec16ff3b47ba59ca9e0216dd1a}\index{Core/\-Utils/\-Legacy Directory Reference@{Core/\-Utils/\-Legacy Directory Reference}}
}
\subsection*{Files}
\begin{DoxyCompactItemize}
\item 
file \hyperlink{_assert_8h}{Assert.\-h}
\begin{DoxyCompactList}\small\item\em Utility for specifying data invariants (Assertions) \end{DoxyCompactList}\item 
file \hyperlink{_check_sum_8h}{Check\-Sum.\-h}
\item 
file \hyperlink{_debug_8cc}{Debug.\-cc}
\item 
file \hyperlink{_debug_8h}{Debug.\-h}
\item 
file \hyperlink{_dir_8cc}{Dir.\-cc}
\item 
file \hyperlink{_dir_8h}{Dir.\-h}
\item 
file \hyperlink{_endian_8cc}{Endian.\-cc}
\item 
file \hyperlink{_endian_8h}{Endian.\-h}
\begin{DoxyCompactList}\small\item\em Detect host endianness and provide tools to swap bytes if necessary. \end{DoxyCompactList}\item 
file \hyperlink{_environment_8cc}{Environment.\-cc}
\item 
file \hyperlink{_environment_8h}{Environment.\-h}
\begin{DoxyCompactList}\small\item\em Interface to setting environemnt variables and parsing .rc files. \end{DoxyCompactList}\item 
file \hyperlink{_environment___defaults_8cc}{Environment\-\_\-\-Defaults.\-cc}
\item 
file \hyperlink{_fancy_assert_8h}{Fancy\-Assert.\-h}
\item 
file \hyperlink{_file_utils_8cc}{File\-Utils.\-cc}
\item 
file \hyperlink{_file_utils_8h}{File\-Utils.\-h}
\item 
file \hyperlink{_full_file_name_8cc}{Full\-File\-Name.\-cc}
\item 
file \hyperlink{_full_file_name_8h}{Full\-File\-Name.\-h}
\item 
file \hyperlink{_log_file_8cc}{Log\-File.\-cc}
\item 
file \hyperlink{_log_file_8h}{Log\-File.\-h}
\item 
file \hyperlink{_memory_util_8h}{Memory\-Util.\-h}
\item 
file \hyperlink{_not_finished_8h}{Not\-Finished.\-h}
\item 
file \hyperlink{_legacy_2_progress_reporter_8cc}{Progress\-Reporter.\-cc}
\item 
file \hyperlink{_legacy_2_progress_reporter_8h}{Progress\-Reporter.\-h}
\item 
file \hyperlink{_rand_8h}{Rand.\-h}
\item 
file \hyperlink{sci__system_8h}{sci\-\_\-system.\-h}
\item 
file \hyperlink{_core_2_utils_2_legacy_2share_8h}{share.\-h}
\item 
file \hyperlink{soloader_8cc}{soloader.\-cc}
\item 
file \hyperlink{soloader_8h}{soloader.\-h}
\item 
file \hyperlink{_string_util_8cc}{String\-Util.\-cc}
\item 
file \hyperlink{_legacy_2_string_util_8h}{String\-Util.\-h}
\item 
file \hyperlink{_throttled_runnable_8cc}{Throttled\-Runnable.\-cc}
\item 
file \hyperlink{_throttled_runnable_8h}{Throttled\-Runnable.\-h}
\item 
file \hyperlink{_timer_8cc}{Timer.\-cc}
\item 
file \hyperlink{_timer_8h}{Timer.\-h}
\begin{DoxyCompactList}\small\item\em Interface to portable timer utility classes. \end{DoxyCompactList}\item 
file \hyperlink{_type_description_8cc}{Type\-Description.\-cc}
\item 
file \hyperlink{_type_description_8h}{Type\-Description.\-h}
\end{DoxyCompactItemize}
