\hypertarget{struct_s_c_i_run_1_1_core_1_1_atomic_counter}{\section{Atomic\-Counter Struct Reference}
\label{struct_s_c_i_run_1_1_core_1_1_atomic_counter}\index{Atomic\-Counter@{Atomic\-Counter}}
}


{\ttfamily \#include $<$String\-Util.\-h$>$}

\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
int \hyperlink{struct_s_c_i_run_1_1_core_1_1_atomic_counter_a5c149bd86d27628e5b14862a5df20f88}{operator()} () const 
\end{DoxyCompactItemize}


\subsection{Member Function Documentation}
\hypertarget{struct_s_c_i_run_1_1_core_1_1_atomic_counter_a5c149bd86d27628e5b14862a5df20f88}{\index{S\-C\-I\-Run\-::\-Core\-::\-Atomic\-Counter@{S\-C\-I\-Run\-::\-Core\-::\-Atomic\-Counter}!operator()@{operator()}}
\index{operator()@{operator()}!SCIRun::Core::AtomicCounter@{S\-C\-I\-Run\-::\-Core\-::\-Atomic\-Counter}}
\subsubsection[{operator()}]{\setlength{\rightskip}{0pt plus 5cm}int operator() (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
) const}}\label{struct_s_c_i_run_1_1_core_1_1_atomic_counter_a5c149bd86d27628e5b14862a5df20f88}


The documentation for this struct was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
Core/\-Utils/\hyperlink{_string_util_8h}{String\-Util.\-h}\item 
Core/\-Utils/\hyperlink{_progress_reporter_8cc}{Progress\-Reporter.\-cc}\end{DoxyCompactItemize}
