\hypertarget{struct_s_c_i_run_1_1_crowd_monitor__private}{\section{Crowd\-Monitor\-\_\-private Struct Reference}
\label{struct_s_c_i_run_1_1_crowd_monitor__private}\index{Crowd\-Monitor\-\_\-private@{Crowd\-Monitor\-\_\-private}}
}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{struct_s_c_i_run_1_1_crowd_monitor__private_a40c9083b5cbfc60a83e366e0579cecb7}{Crowd\-Monitor\-\_\-private} ()
\item 
\hyperlink{struct_s_c_i_run_1_1_crowd_monitor__private_a4581b08f4494b803e19a0106415892f0}{$\sim$\-Crowd\-Monitor\-\_\-private} ()
\end{DoxyCompactItemize}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
pthread\-\_\-rwlock\-\_\-t \hyperlink{struct_s_c_i_run_1_1_crowd_monitor__private_ae9065424a0136cbfef8bb8d6bda46aa3}{lock\-\_\-}
\end{DoxyCompactItemize}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{struct_s_c_i_run_1_1_crowd_monitor__private_a40c9083b5cbfc60a83e366e0579cecb7}{\index{S\-C\-I\-Run\-::\-Crowd\-Monitor\-\_\-private@{S\-C\-I\-Run\-::\-Crowd\-Monitor\-\_\-private}!Crowd\-Monitor\-\_\-private@{Crowd\-Monitor\-\_\-private}}
\index{Crowd\-Monitor\-\_\-private@{Crowd\-Monitor\-\_\-private}!SCIRun::CrowdMonitor_private@{S\-C\-I\-Run\-::\-Crowd\-Monitor\-\_\-private}}
\subsubsection[{Crowd\-Monitor\-\_\-private}]{\setlength{\rightskip}{0pt plus 5cm}{\bf Crowd\-Monitor\-\_\-private} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{struct_s_c_i_run_1_1_crowd_monitor__private_a40c9083b5cbfc60a83e366e0579cecb7}
\hypertarget{struct_s_c_i_run_1_1_crowd_monitor__private_a4581b08f4494b803e19a0106415892f0}{\index{S\-C\-I\-Run\-::\-Crowd\-Monitor\-\_\-private@{S\-C\-I\-Run\-::\-Crowd\-Monitor\-\_\-private}!$\sim$\-Crowd\-Monitor\-\_\-private@{$\sim$\-Crowd\-Monitor\-\_\-private}}
\index{$\sim$\-Crowd\-Monitor\-\_\-private@{$\sim$\-Crowd\-Monitor\-\_\-private}!SCIRun::CrowdMonitor_private@{S\-C\-I\-Run\-::\-Crowd\-Monitor\-\_\-private}}
\subsubsection[{$\sim$\-Crowd\-Monitor\-\_\-private}]{\setlength{\rightskip}{0pt plus 5cm}$\sim${\bf Crowd\-Monitor\-\_\-private} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{struct_s_c_i_run_1_1_crowd_monitor__private_a4581b08f4494b803e19a0106415892f0}


\subsection{Member Data Documentation}
\hypertarget{struct_s_c_i_run_1_1_crowd_monitor__private_ae9065424a0136cbfef8bb8d6bda46aa3}{\index{S\-C\-I\-Run\-::\-Crowd\-Monitor\-\_\-private@{S\-C\-I\-Run\-::\-Crowd\-Monitor\-\_\-private}!lock\-\_\-@{lock\-\_\-}}
\index{lock\-\_\-@{lock\-\_\-}!SCIRun::CrowdMonitor_private@{S\-C\-I\-Run\-::\-Crowd\-Monitor\-\_\-private}}
\subsubsection[{lock\-\_\-}]{\setlength{\rightskip}{0pt plus 5cm}pthread\-\_\-rwlock\-\_\-t lock\-\_\-}}\label{struct_s_c_i_run_1_1_crowd_monitor__private_ae9065424a0136cbfef8bb8d6bda46aa3}


The documentation for this struct was generated from the following file\-:\begin{DoxyCompactItemize}
\item 
Core/\-Thread/\-Legacy/\hyperlink{_crowd_monitor__pthreads_8cc}{Crowd\-Monitor\-\_\-pthreads.\-cc}\end{DoxyCompactItemize}
