\hypertarget{struct_s_c_i_run_1_1_dataflow_1_1_engine_1_1_disable_dynamic_port_switch}{\section{Disable\-Dynamic\-Port\-Switch Struct Reference}
\label{struct_s_c_i_run_1_1_dataflow_1_1_engine_1_1_disable_dynamic_port_switch}\index{Disable\-Dynamic\-Port\-Switch@{Disable\-Dynamic\-Port\-Switch}}
}


{\ttfamily \#include $<$Network\-Editor\-Controller.\-h$>$}

\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{struct_s_c_i_run_1_1_dataflow_1_1_engine_1_1_disable_dynamic_port_switch_a85f1ce9bb7d05dc90ed45990e1eb0947}{Disable\-Dynamic\-Port\-Switch} (boost\-::shared\-\_\-ptr$<$ \hyperlink{class_s_c_i_run_1_1_dataflow_1_1_engine_1_1_dynamic_port_manager}{Dynamic\-Port\-Manager} $>$ dpm)
\item 
\hyperlink{struct_s_c_i_run_1_1_dataflow_1_1_engine_1_1_disable_dynamic_port_switch_a4d3d6c7bcf0f3867b95d3dfd09754b42}{$\sim$\-Disable\-Dynamic\-Port\-Switch} ()
\end{DoxyCompactItemize}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{struct_s_c_i_run_1_1_dataflow_1_1_engine_1_1_disable_dynamic_port_switch_a85f1ce9bb7d05dc90ed45990e1eb0947}{\index{S\-C\-I\-Run\-::\-Dataflow\-::\-Engine\-::\-Disable\-Dynamic\-Port\-Switch@{S\-C\-I\-Run\-::\-Dataflow\-::\-Engine\-::\-Disable\-Dynamic\-Port\-Switch}!Disable\-Dynamic\-Port\-Switch@{Disable\-Dynamic\-Port\-Switch}}
\index{Disable\-Dynamic\-Port\-Switch@{Disable\-Dynamic\-Port\-Switch}!SCIRun::Dataflow::Engine::DisableDynamicPortSwitch@{S\-C\-I\-Run\-::\-Dataflow\-::\-Engine\-::\-Disable\-Dynamic\-Port\-Switch}}
\subsubsection[{Disable\-Dynamic\-Port\-Switch}]{\setlength{\rightskip}{0pt plus 5cm}{\bf Disable\-Dynamic\-Port\-Switch} (
\begin{DoxyParamCaption}
\item[{boost\-::shared\-\_\-ptr$<$ {\bf Dynamic\-Port\-Manager} $>$}]{dpm}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [explicit]}}}\label{struct_s_c_i_run_1_1_dataflow_1_1_engine_1_1_disable_dynamic_port_switch_a85f1ce9bb7d05dc90ed45990e1eb0947}
\hypertarget{struct_s_c_i_run_1_1_dataflow_1_1_engine_1_1_disable_dynamic_port_switch_a4d3d6c7bcf0f3867b95d3dfd09754b42}{\index{S\-C\-I\-Run\-::\-Dataflow\-::\-Engine\-::\-Disable\-Dynamic\-Port\-Switch@{S\-C\-I\-Run\-::\-Dataflow\-::\-Engine\-::\-Disable\-Dynamic\-Port\-Switch}!$\sim$\-Disable\-Dynamic\-Port\-Switch@{$\sim$\-Disable\-Dynamic\-Port\-Switch}}
\index{$\sim$\-Disable\-Dynamic\-Port\-Switch@{$\sim$\-Disable\-Dynamic\-Port\-Switch}!SCIRun::Dataflow::Engine::DisableDynamicPortSwitch@{S\-C\-I\-Run\-::\-Dataflow\-::\-Engine\-::\-Disable\-Dynamic\-Port\-Switch}}
\subsubsection[{$\sim$\-Disable\-Dynamic\-Port\-Switch}]{\setlength{\rightskip}{0pt plus 5cm}$\sim${\bf Disable\-Dynamic\-Port\-Switch} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{struct_s_c_i_run_1_1_dataflow_1_1_engine_1_1_disable_dynamic_port_switch_a4d3d6c7bcf0f3867b95d3dfd09754b42}


The documentation for this struct was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
Dataflow/\-Engine/\-Controller/\hyperlink{_network_editor_controller_8h}{Network\-Editor\-Controller.\-h}\item 
Dataflow/\-Engine/\-Controller/\hyperlink{_network_editor_controller_8cc}{Network\-Editor\-Controller.\-cc}\end{DoxyCompactItemize}
